en	Media query

en	Here you can define when to use the image size, e.g. <em>(max-width: 600px)</em>.

en	Invisible

en	Do not use the image size definition.

en	Revision date

en	Date and time of the latest revision

en	Image size settings

en	Expert settings

en	Visibility

en	New image size media query

en	Create a new image size media query

en	Image size media query details

en	Show the details of image size media query ID %s

en	Edit image size media query

en	Edit image size media query ID %s

en	Move image size media query

en	Move image size media query ID %s

en	Duplicate image size media query

en	Duplicate image size media query ID %s

en	Delete image size media query

en	Delete image size media query ID %s

en	Edit image size

en	Edit the image size settings

en	Paste at the top

en	Paste after image size media query ID %s

en	Add new at the top

en	Add new after image size media query ID %s

en	Toggle visibility

en	Toggle the visibility of image size media query ID %s