en	Media query

en	Here you can define when to use the image size, e.g. <em>(max-width: 600px)</em>.

en	Invisible
sl	Nevidno

en	Do not use the image size definition.

en	Revision date
sl	Datum revizije

en	Date and time of the latest revision
sl	Datum in ura zadnje revizije

en	Image size settings
sl	Nastavitve velikosti slike

en	Expert settings
sl	Napredne nastavitve

en	Visibility
sl	Vidnost

en	New image size media query

en	Create a new image size media query

en	Image size media query details

en	Show the details of image size media query ID %s

en	Edit image size media query

en	Edit image size media query ID %s

en	Move image size media query

en	Move image size media query ID %s

en	Duplicate image size media query

en	Duplicate image size media query ID %s

en	Delete image size media query

en	Delete image size media query ID %s

en	Edit image size
sl	Uredi velikost slike

en	Edit the image size settings

en	Paste at the top
sl	Prilepi na vrh

en	Paste after image size media query ID %s

en	Add new at the top
sl	Dodaj novo na vrh

en	Add new after image size media query ID %s

en	Toggle visibility
sl	Preklopi vidljivost

en	Toggle the visibility of image size media query ID %s