en	An error occurred

en	What's the matter?

en	How can I fix the issue?

en	Tell me more, please

en	To customize this notice, create a custom template file named <em>%s</em>.

en	An error occurred while executing this script. Something does not work properly.

en	Open the <code>system/logs/error.log</code> file and find the associated error message (usually the last one). You can also add the following line to the local configuration file and reload this page:

en	However, please be aware that <strong>anyone</strong> will be able to see error messages on your website then!

en	The script execution stopped, because something does not work properly. The actual error message is hidden by this notice for security reasons and can be found in the <code>system/logs/error.log</code> file (see above). If you do not understand the error message or do not know how to fix the problem, search the <a href="https://contao.org/faq.html" target="_blank">Contao FAQs</a> or visit the <a href="https://contao.org/support.html" target="_blank">Contao support page</a>.

en	Invalid request token

en	The request token could not be verified.

en	Please <a href="javascript:window.location.href=window.location.href">click this link</a> and try again. Do not use the back button of your browser.

en	This error occurs if there is a POST request without a valid authentication token. In Contao 2.10, the referer check has been replaced with a request token system. If the problem persists, you may be using an incompatible third-party extension or have not correctly updated your Contao installation.

en	For more information, search the <a href="https://contao.org/faq.html" target="_blank">Contao FAQs</a> or visit the <a href="https://contao.org/support.html" target="_blank">Contao support page</a>.

en	Incomplete installation

en	The installation has not been completed, therefore Contao cannot work properly.

en	Point your browser to the following URL:

en	path-to-installation

en	This will open the Contao install tool, which will guide you through the installation process.

en	For more information, please refer to the <a href="https://contao.org/manual/installation.html" target="_blank">Contao manual</a>.

en	Page not found

en	The page you have requested does not exist under this domain.

en	Try to <a href="%s">go to the top level</a> and use the search function (if any) to find the page you were looking for. You may also <a href="%s">contact the webmaster</a> and let him know that there is something wrong.

en	Forward page not found

en	The application has been configured to forward the request to another page, however, the target page does not exist or has not been published.

en	This is something that needs to be fixed by the administrator of the website. If you are a visitor, there is nothing you can do except to <a href="%s">contact the webmaster</a> to let him know that there is something wrong.

en	No root page found

en	There is no website root page which matches the requested language and/or domain name.

en	If you have explicitly set a language, try to <a href="%s">go to the top level</a> and see whether you are being redirected. Otherwise <a href="%s">contact the webmaster</a> and let him know that there is something wrong.

en	No layout specified

en	The page you have requested has not yet been associated with a page layout.

en	Make sure that you have assigned a page layout to each website root page in the site structure.

en	For more information, please refer to the <a href="https://contao.org/manual/managing-pages.html" target="_blank">Contao manual</a>.

en	No active pages found

en	Your request has been mapped to a website which does not yet contain any published pages.

en	Most likely, the website is still under development and will be online in a few days. If you still think that there is something wrong, <a href="%s">contact the webmaster</a> and let him know.

en	Forbidden

en	You are either not authenticated or you are not allowed to access the requested page.

en	If you are not logged in, try to <a href="%s">go to the top level</a> and look for a login form. If there is no login form or if you are logged in already, <a href="%s">contact the webmaster</a> and let him know that there is something wrong.

en	We'll be right back

en	The website is currently down for maintenance. Please come back later.